X-Git-Url: https://git.llucax.com/mecon/ai.git/blobdiff_plain/081e4c047b542c7cab0682f4ed70f6817d8bb0ec..c3e87c06cf63d18cc37264de1bf8c611da031cad:/sql/sistema.sql

diff --git a/sql/sistema.sql b/sql/sistema.sql
index d2cc0a5..81ffc41 100644
--- a/sql/sistema.sql
+++ b/sql/sistema.sql
@@ -33,5 +33,6 @@ CREATE TABLE sistema (
     link            VARCHAR(255)            NOT NULL default '',
     link_ayuda      VARCHAR(255)            NOT NULL default '',
     habilitado      TINYINT(1)              NOT NULL default 1,
+    tipo            ENUM('php', 'embperl')  NOT NULL default 'php',
     PRIMARY KEY (sistema)
 );
