X-Git-Url: https://git.llucax.com/mecon/yatta.git/blobdiff_plain/de0d2712aeb708b7077beaaa2220d3e24d52ddfd..de6df3bbeeea2b01a900d68284a575d019352abe:/script/instalacion/generacion_base.sql?ds=inline

diff --git a/script/instalacion/generacion_base.sql b/script/instalacion/generacion_base.sql
index e6fad5c..2dd20c3 100644
--- a/script/instalacion/generacion_base.sql
+++ b/script/instalacion/generacion_base.sql
@@ -37,7 +37,7 @@ CREATE TABLE procesos (
 CREATE TABLE servidores (
     id int(10) NOT NULL auto_increment,
     nombre varchar (20) NOT NULL, 
-    escala tinyint(1) default 9,
+    escala integer(11) default 9,
     procesos int(10) default 0,
     PRIMARY KEY  (id)
 ) TYPE=MyISAM;
